evil-loop +RTS -h -sstderr 9,565,709 bytes x seconds Tue Jan 5 11:32 2016

seconds

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 bytes

0k

500k

1,000k

1,500k

2,000k

2,500k

3,000k

3,500k

4,000k

4,500k

(92)main/CAF:main

(94)main.xs/main/CAF:main