timeouttest +RTS -hc 8,859,570,200 bytes x seconds Tue Mar 23 06:13 2010

seconds

0.0 20.0 40.0 60.0 bytes

0M

20M

40M

60M

80M

100M

120M

140M

(224)Main.CAF