hkl3d +RTS -N -p -s -hr -i0.1 134,594,960 bytes x seconds Mon Sep 30 17:52 2019

seconds

0.0 20.0 40.0 60.0 80.0 100.0 bytes

0k

200k

400k

600k

800k

1,000k

1,200k

1,400k

(90)CAF

(58)CAF

(475)peek,concurrently

(390)SYSTEM,concurrently

(474)peek

(276)get_image.\.\

(100)CAF,MAIN

(271)get_ub

(2)SYSTEM

(91)MAIN

(200)framesP.\.\.\.\.\.\.

(372)concurrently